\hypertarget{structNodeEq}{}\doxysection{Node\+Eq Struct Reference}
\label{structNodeEq}\index{NodeEq@{NodeEq}}
\doxysubsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structNodeEq_af98d9869ec062d3817c096c456a6f6d6}\label{structNodeEq_af98d9869ec062d3817c096c456a6f6d6}} 
bool {\bfseries operator()} (const \mbox{\hyperlink{structnode}{NODE}} $\ast$lhs, const \mbox{\hyperlink{structnode}{NODE}} $\ast$rhs) const
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line 1511 of file optimize.\+cc.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{optimize_8cc}{optimize.\+cc}}\end{DoxyCompactItemize}
