\hypertarget{structbufIPstruct}{}\doxysection{buf\+I\+Pstruct Struct Reference}
\label{structbufIPstruct}\index{bufIPstruct@{bufIPstruct}}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structbufIPstruct_a3f46088f73381ae0537b279542cd3096}\label{structbufIPstruct_a3f46088f73381ae0537b279542cd3096}} 
L\+O\+NG {\bfseries i}
\item 
\mbox{\Hypertarget{structbufIPstruct_ad07af20c90cd61e5f6eb88e4f4445acd}\label{structbufIPstruct_ad07af20c90cd61e5f6eb88e4f4445acd}} 
struct \mbox{\hyperlink{structExPrEsSiOn}{Ex\+Pr\+Es\+Si\+On}} {\bfseries e}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}


Definition at line 3908 of file parallel.\+c.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{parallel_8c}{parallel.\+c}}\end{DoxyCompactItemize}
