\hypertarget{structStOrEcAcHe}{}\doxysection{St\+Or\+Ec\+Ac\+He Struct Reference}
\label{structStOrEcAcHe}\index{StOrEcAcHe@{StOrEcAcHe}}


{\ttfamily \#include $<$structs.\+h$>$}

\doxysubsection*{Public Member Functions}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structStOrEcAcHe_ace9e6026b1c0d99bdb91f20a358482ed}\label{structStOrEcAcHe_ace9e6026b1c0d99bdb91f20a358482ed}} 
{\bfseries P\+A\+D\+P\+O\+S\+I\+T\+I\+ON} (1, 0, 0, 2, 0)
\end{DoxyCompactItemize}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\Hypertarget{structStOrEcAcHe_a31364dad6fab5c2c6d1a123cbc9154e1}\label{structStOrEcAcHe_a31364dad6fab5c2c6d1a123cbc9154e1}} 
\mbox{\hyperlink{structPoSiTiOn}{P\+O\+S\+I\+T\+I\+ON}} {\bfseries position}
\item 
\mbox{\Hypertarget{structStOrEcAcHe_ad47aa8e3edbb9e43c688951e571cab3f}\label{structStOrEcAcHe_ad47aa8e3edbb9e43c688951e571cab3f}} 
\mbox{\hyperlink{structPoSiTiOn}{P\+O\+S\+I\+T\+I\+ON}} {\bfseries toppos}
\item 
\mbox{\Hypertarget{structStOrEcAcHe_a9fa7faed53aa0050b5cdd4ca14f7cbe9}\label{structStOrEcAcHe_a9fa7faed53aa0050b5cdd4ca14f7cbe9}} 
struct \mbox{\hyperlink{structStOrEcAcHe}{St\+Or\+Ec\+Ac\+He}} $\ast$ {\bfseries next}
\item 
\mbox{\Hypertarget{structStOrEcAcHe_a3b7c45da7e0f37a8a5d60cfe96c1fb5d}\label{structStOrEcAcHe_a3b7c45da7e0f37a8a5d60cfe96c1fb5d}} 
W\+O\+RD {\bfseries buffer} \mbox{[}2\mbox{]}
\end{DoxyCompactItemize}


\doxysubsection{Detailed Description}
The struct of type S\+T\+O\+R\+E\+C\+A\+C\+HE is used by a caching system for reading terms from stored expressions. Each thread should have its own system of caches. 

Definition at line 1011 of file structs.\+h.



The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
\mbox{\hyperlink{structs_8h}{structs.\+h}}\end{DoxyCompactItemize}
